Table 5. Shape Models and Density For Varuna

Model Shape Axis Ratios^a Density [kg m^{−3}]

Albedo Spots Sphere 1:1:1 ≥ 1090 Jacobi Ellipsoid ≥1.5:1.0:0.7 ≥ 1050 Binary Contact Spheres ≥1.4:1 ≥ 996 Binary Roche Ellipsoids 1.06:1, 1.67:1 3600

aFor the binary models, the listed ”axis ratio” is the ratio of the diameters of the separate components