Table 4. Comparison of Rotational Color Variations

Object Δm Δm(B-V) Reference [mag.] [mag.]

Varuna 0.42 ± 0.02 < 0.02 This Work Iapetus ∼ 2 0.07 − 0.10 Millis (1977) Pluto 0.35 0.01 Buie, Tholen and Wasserman (1997)