0 . 0 0 . 2 0 . 4 0 . 6 0 . 8 1 . 0 1 . 2 0 . 5 1 . 0 1 . 5 2 . 0 2 . 5

Cruikshank et al. Model

Pholus spectrum

Pholus narrowband data

Normalized ReflectanceWavelength [mm]