0.20.30.423452122232425 rmax = 500 km rmax = 1000 km

Bias Correction Factor b(q, r m a x

)

Expected Number of 2:1 Objects (b = 0.3)Apparent Red Magnitude, mR q = 3.5q = 4.0q = 4.5 8