0 . 0 0 . 2 0 . 4 0 . 6 0 . 8 1 . 0 0 . 0 0 . 5 1 . 0 1 . 5 2 . 0 2 . 5 3 . 0 3 . 5 4 . 0

1997 CU26

Stellar PSF

Normalized Surface BrightnessRadius [arcsec]Fig. 2: Jewitt and Kalas (1998)